0.4 0.6 0.8 1.0 1.2 1.4 )c (GeV/ Tp

0.2 0.4

0.6 0.8

1.0

-1)c

) (GeV/ yd_Tp /(d N^2 d

evt, trig N1/ antiprotons Away 2× Transverse 4× Toward

vy-Tsallis fit eL

ALICE

= 5.02 TeV NNs Pb, −p c > 5 GeV/

lead Tp

0.4 0.6 0.8 1.0 1.2 1.4 )c (GeV/ Tp 0.84

0.92 1.0

Toward

Ratio to

ALI-PUB-620769

ALI-PUB-620769